%%%%%%%%%%%%%%%%%
%
% scale.tex
%
%%%%%%%%%%%%%%%%
\def\mtxversion{0.63a}
\def\mtxdate{<8 April 2018>}
\input mtx
\input musixtex
\input pmx
\setmaxslurs{24}\setmaxinstruments{24}%
\smallmusicsize%
\nopagenumbers
\tracingstats=2\relax
\hsize= 85pt
\vsize740pt
\def\nbinstruments{1}
\setstaffs11
\setclef10
\setname1{ }
\generalsignature{ 0}%
\generalmeter\meterC%
\parindent 0pt
\elemskip1pt\afterruleskip1.000pt\beforeruleskip0pt\relax
\stafftopmarg0pt\staffbotmarg5\Interligne\interstaff{10}\relax
\nostartrule
\readmod{scale}
\mtxSetSize{1}{\mtxSmallSize}%
\startmuflex\startpiece\addspace\afterruleskip%
\znotes\zcharnote{16}{\titles{2.0}{}{0}{}{0}{}{0}}\en%
% Bar count 1
\pnotes{2.00}\ibu1d2\qb1c\qb1d\qb1e\tbu1\qb1f\en%
\pnotes{4.00}\hu g\en%
\endpiece
\vfill\eject\endmuflex
\bye
